-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.67


######### Lightcurve features #########

amplitude  =  0.49564683406
cusum  =  0.217065593876
eta  =  0.482171867168
hl_amp_ratio  =  0.378105307044
kurtosis  =  -0.863485458887
n_points  =  96
period  =  0.634908334103
period_SNR  =  14.7967085746
period_log10FAP  =  -9.13897190393
period_uncertainty  =  0.000183393525405
phase_cusum  =  0.274623372344
phase_eta  =  0.303272541212
phi21  =  -2.15240185659
phi31  =  -4.24405942869
quartile31  =  0.5575
r21  =  0.56799994426
r31  =  0.222561571135
shapiro_w  =  0.946647167206
skewness  =  -0.433937796439
slope_per10  =  -0.123382953148
slope_per90  =  0.529999984428
stetson_k  =  0.778821787489
weighted_mean  =  11.4659637562
weighted_std  =  0.421021797518
