-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.56


######### Lightcurve features #########

amplitude  =  0.438161546046
cusum  =  0.334780402148
eta  =  0.193147970895
hl_amp_ratio  =  0.482247351253
kurtosis  =  -0.305865011567
n_points  =  353
period  =  1.00001905638
period_SNR  =  32.0153097145
period_log10FAP  =  -30.2827740001
period_uncertainty  =  0.000217679386975
phase_cusum  =  0.27846669459
phase_eta  =  0.820777204052
phi21  =  -0.23125370977
phi31  =  -3.04363187646
quartile31  =  0.57
r21  =  0.0552758569476
r31  =  0.208810008448
shapiro_w  =  0.930070281029
skewness  =  -0.730478095779
slope_per10  =  -0.0495166634209
slope_per90  =  0.098430863551
stetson_k  =  0.77667908468
weighted_mean  =  11.0077053824
weighted_std  =  0.393798388761
