-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.303515386112
cusum  =  0.150380443814
eta  =  0.451540118191
hl_amp_ratio  =  0.385278904602
kurtosis  =  -0.186255041549
n_points  =  388
period  =  0.462560776359
period_SNR  =  34.4837578306
period_log10FAP  =  -34.8302023137
period_uncertainty  =  0.000119069400486
phase_cusum  =  0.191749919186
phase_eta  =  0.841240885803
phi21  =  -2.38604851392
phi31  =  -1.35463204649
quartile31  =  0.42
r21  =  0.333557664166
r31  =  0.17914563627
shapiro_w  =  0.91333770752
skewness  =  -0.837088419161
slope_per10  =  -0.0488503380422
slope_per90  =  0.0603598611706
stetson_k  =  0.743328453127
weighted_mean  =  16.0883644941
weighted_std  =  0.29026882962
