-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.309425788551
cusum  =  0.174252582805
eta  =  0.631912675128
hl_amp_ratio  =  0.393159241676
kurtosis  =  -1.13365946623
n_points  =  265
period  =  0.697555863133
period_SNR  =  37.1805027472
period_log10FAP  =  -32.6197154592
period_uncertainty  =  0.000248319102682
phase_cusum  =  0.255615708794
phase_eta  =  0.330653983679
phi21  =  -2.04811028261
phi31  =  -3.99587188378
quartile31  =  0.54
r21  =  0.485166178513
r31  =  0.255316076042
shapiro_w  =  0.920597672462
skewness  =  -0.446284587772
slope_per10  =  -0.13538693107
slope_per90  =  0.207179921263
stetson_k  =  0.736484939635
weighted_mean  =  16.9064180612
weighted_std  =  0.314606744042
