-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.356415197781
cusum  =  0.22862977405
eta  =  0.527232653466
hl_amp_ratio  =  0.381474915971
kurtosis  =  -0.814803152895
n_points  =  288
period  =  0.598132670321
period_SNR  =  40.7007278789
period_log10FAP  =  -36.2596224114
period_uncertainty  =  0.000127742442714
phase_cusum  =  0.314478072408
phase_eta  =  0.243837641014
phi21  =  3.81203465666
phi31  =  4.90508804514
quartile31  =  0.51
r21  =  0.469084888791
r31  =  0.299402374966
shapiro_w  =  0.913649082184
skewness  =  -0.642009696616
slope_per10  =  -0.144525164494
slope_per90  =  0.182233382648
stetson_k  =  0.75155934913
weighted_mean  =  15.1046798512
weighted_std  =  0.317784249699
