-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.212565849695
cusum  =  0.161616461056
eta  =  0.810566765479
hl_amp_ratio  =  0.59931468611
kurtosis  =  -1.00559154615
n_points  =  143
period  =  0.603350161683
period_SNR  =  20.4381639078
period_log10FAP  =  -13.2034316335
period_uncertainty  =  0.000172607695245
phase_cusum  =  0.30442288565
phase_eta  =  0.378008352127
phi21  =  1.14683125692
phi31  =  2.86154632839
quartile31  =  0.3
r21  =  0.514394268725
r31  =  0.297513670877
shapiro_w  =  0.955537378788
skewness  =  -0.299176392105
slope_per10  =  -0.319570170281
slope_per90  =  0.350420830461
stetson_k  =  0.815306931378
weighted_mean  =  15.613004787
weighted_std  =  0.194786116781
