<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.25


######### Lightcurve features #########

amplitude  =  0.262785560876
cusum  =  0.369134200829
eta  =  0.450147141465
hl_amp_ratio  =  0.29568898405
kurtosis  =  -1.36968749346
n_points  =  43
period  =  0.372486849867
period_SNR  =  7.78189506631
period_log10FAP  =  -3.19097556365
period_uncertainty  =  9.58124516451e-05
phase_cusum  =  0.30037327818
phase_eta  =  0.374133539252
phi21  =  0.587621719911
phi31  =  2.28621732953
quartile31  =  0.33
r21  =  0.174677809559
r31  =  0.207894854386
shapiro_w  =  0.845490098
skewness  =  -0.513071482881
slope_per10  =  -0.684799998999
slope_per90  =  0.274000009522
stetson_k  =  0.763778483381
weighted_mean  =  12.9210462428
weighted_std  =  0.165172892954
</pre></body></html>