-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.289102254429
cusum  =  0.251352728656
eta  =  0.578238725416
hl_amp_ratio  =  0.420760255312
kurtosis  =  0.034565860803
n_points  =  92
period  =  0.698701160471
period_SNR  =  10.4723769574
period_log10FAP  =  -6.8586078285
period_uncertainty  =  0.00010557588039
phase_cusum  =  0.321299923062
phase_eta  =  0.590384869452
phi21  =  -2.04577783621
phi31  =  -4.43644986329
quartile31  =  0.385
r21  =  0.249366828663
r31  =  0.223182410974
shapiro_w  =  0.886634945869
skewness  =  -0.989766147739
slope_per10  =  -0.123330239682
slope_per90  =  0.499700014479
stetson_k  =  0.729150356792
weighted_mean  =  13.2917391304
weighted_std  =  0.310117820162
