<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.205727033974
cusum  =  0.271003616588
eta  =  0.90632065158
hl_amp_ratio  =  0.774326639229
kurtosis  =  -0.937420480302
n_points  =  38
period  =  0.715921536898
period_SNR  =  7.4637278531
period_log10FAP  =  -1.23649938237
period_uncertainty  =  0.00029108422657
phase_cusum  =  0.319440807774
phase_eta  =  0.714938257963
phi21  =  -2.30756942396
phi31  =  -2.61138826697
quartile31  =  0.3025
r21  =  0.255418721793
r31  =  0.272466016247
shapiro_w  =  0.94360768795
skewness  =  -0.361729494925
slope_per10  =  -0.180941062216
slope_per90  =  0.540946439763
stetson_k  =  0.790914068557
weighted_mean  =  15.4765897392
weighted_std  =  0.215089937571
</pre></body></html>