-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.500667022015
cusum  =  0.169232727457
eta  =  0.826046734385
hl_amp_ratio  =  0.624187631394
kurtosis  =  -0.845448718092
n_points  =  113
period  =  0.442545573805
period_SNR  =  23.2495641262
period_log10FAP  =  -12.2619829678
period_uncertainty  =  0.000139318626303
phase_cusum  =  0.28408574092
phase_eta  =  0.139925004054
phi21  =  -2.27471448208
phi31  =  -4.37966905418
quartile31  =  0.63
r21  =  0.471709764029
r31  =  0.216565793253
shapiro_w  =  0.924357175827
skewness  =  -0.497922969
slope_per10  =  -0.136704407347
slope_per90  =  0.231673837295
stetson_k  =  0.81322018107
weighted_mean  =  14.6551128247
weighted_std  =  0.406412829586
