-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.245108364315
cusum  =  0.152124231285
eta  =  0.517652768869
hl_amp_ratio  =  0.523791334105
kurtosis  =  -0.410014007481
n_points  =  232
period  =  0.653949149429
period_SNR  =  25.9669108327
period_log10FAP  =  -26.1542603208
period_uncertainty  =  0.000146504932175
phase_cusum  =  0.250887381936
phase_eta  =  0.366491570663
phi21  =  3.77949661963
phi31  =  5.41705513987
quartile31  =  0.3
r21  =  0.37248637229
r31  =  0.145905061337
shapiro_w  =  0.955178618431
skewness  =  -0.60480557883
slope_per10  =  -0.182041663599
slope_per90  =  0.21970832992
stetson_k  =  0.793474607447
weighted_mean  =  12.0085775862
weighted_std  =  0.207593254943
