-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.335770554124
cusum  =  0.281970396809
eta  =  1.80959012501
hl_amp_ratio  =  0.334116654861
kurtosis  =  -0.309228007276
n_points  =  15
period  =  0.0596034394891
period_SNR  =  5.72821766506
period_log10FAP  =  0.0
period_uncertainty  =  1.26460662641e-06
phase_cusum  =  0.389724126891
phase_eta  =  1.23486741806
phi21  =  -3.12589354892
phi31  =  -2.20532192163
quartile31  =  0.255
r21  =  0.179529775415
r31  =  0.139056812139
shapiro_w  =  0.896801173687
skewness  =  -0.855421978107
slope_per10  =  -0.0852964298401
slope_per90  =  0.0914770626028
stetson_k  =  0.6622887826
weighted_mean  =  15.6476625478
weighted_std  =  0.2224907486
